-0.4

-0.2

0.0

0.2

0.4

3000 4000 5000 6000 7000 8000 Wavelength (A) o

Color (relative to BC, normalized to HD 186427)

HD Spect. u-b 11131dG1 1.484 81809G2 1.540 25680G5 1.533 146233G2 1.577 186408G1.5 1.605 29461G5 1.621 191854G5 1.606 186427G2.5 1.622 28099G2 1.619 30246G5 1.621 76151G3 1.626 217014G2.5 1.688

HB Stromgren u v b y Johnson U V B R